0 0.5 1

-20 0 20

0.650.70.750.8

-1 -0.9 -0.8

0 20 40 60 ξ^0 η0

0 0.5 1 -20

0

20

ΩDE0

0 0.5 1

0.65 0.7 0.75 0.8 w0

0 0.5 1 -1

-0.9

-0.8

ε^0 ξ0

0 0.5 1 0 20 40 60

-20 0 20

0.65 0.7 0.75 0.8

-20 0 20 -1

-0.9

-0.8

η^0

-20 0 20 0 20 40 60 0.650.70.750.8 -1

-0.9

-0.8

Ω_{DE}^0

0.650.70.750.8 0 20 40 60

w^0

-1 -0.9 -0.8 0 20 40 60