0 0.1 0.2

-2 2 6

0.72 0.74

-1 -0.95 w_0 η0

0 0.1 0.2 -2 0 2 4 6 8

ΩDE,0

0 0.1 0.2

0.72

0.73

0.74

0.75

ε_0 w0

0 0.1 0.2 -1 -0.98

-0.96

-2 2 6

0.72

0.73

0.74

0.75

η_0

-2 2 6 -1 -0.98

-0.96

Ω_{DE,0}

0.72 0.74 -1 -0.98

-0.96